Code 9 -- Symbol library --

  parameter structure
 _____________________________________________________________
|   p1    |    p2     |    p3      |     p4    |      p5      |
|code num.| staff num.| horiz. pos.| vert. pos.| libr. number |
|____9____|___________|____________|___________|______________|

 ________________________________________________
|     p6     |     p7     |    p8     |    p9    |
| horz. size | vert. size | thickness | rotation |
|____________|____________|___________|__________|


  The normal vertical position (position at p4 = 0) for Code 9 library
  items varies.




*
P5 library number table:
 0 = treble clef         10 = double sharp        20 = note tail
 1 = bass    "           11 = black note          21 = wedge accent
 2 = alto    "           12 = half note           22 = normal accent
 3 = (not used)          13 = whole note          23 = tenuto (dash)
 4 = percuss. clef       14 = breve               24 = staccato (dot)
 5 = curved brace        15 = white diamond       25 = wedge-dot
 6 = flat                16 = black    "          26 = accent-dot
 7 = sharp               17 = x note              27 = tenuto-dot
 8 = natural             18 = common time C       28 = down bow
 9 = double flat         19 = slash, alla breve   29 = up bow

30 = harmonic            40 = breve rest          50 = pppp
31 = fermata             41 = whole rest          51 = ppp
32 = arsis sign          42 = half rest           52 = pp
33 = thesis sign         43 = quarter rest        53 = p
34 = mordant             44 = eighth rest         54 = mp
35 = inverted mordant    45 = 8va                 55 = mf
36 = heavy wedge         46 = 8ba                 56 = f
37 = tr                  47 = 15ma                57 = ff
38 = +                   48 = pedal sign          58 = fff
39 = measure repeat      49 = pedal filler        59 = ffff

*


60 = fp                  70 = Ped.                80 = meno
61 = sf                  71 = star                81 = piu
62 = sfz                 72 = gliss.              82 = arrow
63 = cresc.              73 = molto               83 = long arrow
64 = dim.                74 = "segno"             84 = old pedal sign
65 = rit.                75 = turn                85 = subito
66 = pizz.               76 = //                  86 = poco
67 = arco                77 = system divider      87 = guitar chord grid
68 = accel.              78 = a tempo             88 = open circle
69 = arrow               79 = (open)              89 = black circle

90 = circle+            100 = early mus. notes   110 = F clef
91 = ( )                101 =   "                111 = decresc.
92 = (>)                102 =   "                112 = coda sign
93 = ornament           103 =   "                113 = rall.
94 =    "               104 =   "                114 = mosso
95 = diamondX           105 =   "
96 = bracket            106 =   "
97 = (b)                107 =   "
98 = (#)                108 =   "
99 = (nat.)             109 =   "

*


  P6 is the horizontal size factor.  However if p7 is left at zero
  the horizontal and vertical sizes are both controled by p6.

  P8 values are entered in the form "x0y", where x = the added vertical
  thickness and y = the added horizontal thickness.

  P9 = clockwise rotation in degrees.



.