The following keys are active in the Pitch Input section of SCORE.

SCORE Command Language:

       M or F3   - Measure line.
       Mn        - Measure line up n staves.
       MD        - Double measure line.
       MR        - Repeat measure line (right).
       ML or MRL - Repeat measure line (left).
       MRD       - Double repeat measure line (both).
       MH        - Heavy double measure line.
       MS or MDS - Dashed measure line.
       MI        - Invisible measure line (dotted on screen).
       TR        - Treble clef.
       BA        - Bass clef.
       AL        - Alto clef.
       TE        - Tenor clef.
       K         - Key signature of displayed key.
       KnS       - Key signature of n sharps.
       KnF       - Key signature of n flats.
       KnSN      - Key signature of n naturals/sharp pattern.
       KnFN      - Key signature of n naturals/flat pattern.

*
SCORE Command Language (continued):

       <ESC>     - Abandon Input and Exit to Input Setup Section.
       F1        - HELP section.
       T         - Time signature of displayed meter.
       Tn1 n2    - Time signature for meter n1/n2.
       T99 1     - Time signature for Common time.
       T98 1     - Time signature for Cut time (alla breve).
       A to C    - Pitches A through C.
       F, S, N   - Follows pitches for Flat, Sharp, and Natural.
       0 to 8    - Follows pitches for octaves 0 through 8.
       R or F2   - Rest of any duration.
       RW        - Whole rest regardless of duration.
       RF        - Rest with fermata.
       RU        - Rest up higher on the staff.
       RD        - Rest down lower on the staff.
       Rn        - Whole rest with number for n bars rest.
       RP        - Repeat measure symbol ( / ).
       SU or F4  - Force following notes to have Stems Up.
       SD or F5  - Force following notes to have Stems Down.
       SO or F6  - Restore automatic stem direction (Stems Ordinary).

*
SCORE Command Language (continued):

       P or F7   - Proximity mode on (regarding octaves).
       O or F8   - Proximity mode off (Ordinary mode on).
       Xn        - Repeat pitch, etc. for n times (e.g., CS4x4).
       /         - Slash is used to separate the above commands.
       //        - Extra slash(es) repeat previous command.
       :         - Colon is used to separate chord pitches.
       ;         - Semi-colon is used to end pitch input.


Alternate Keystrokes for windowing:   (Hold down <Alt> and press a key)

       Alt D - DOWN. Move bottom of text window DOWN 1 line (make it bigger).
       Alt F - FULL. Toggle FULL screen graphics on/off.
       Alt M - MENU. Toggle function key MENU on/off.
       Alt U - UP.   Move bottom of text window UP 1 line (make it smaller).

*
Keystrokes for text window and line editing:
       Home      - Clear text window.
       Lft Arrow - Move text cursor left for line editing.
       Rht Arrow - Move text cursor right for line editing.
       Ins       - Toggle insert mode on/off for line editing.
       Del       - Delete character at current cursor location.
       BackSpace - Backup one space and delete character.
       Ctrl R    - Regenerate last text line entered (must be first character).

Mouse: (The mouse buttons are defined (L)eft, (M)iddle, and (R)ight below)
       Click L or R button on staff  - Enter pitch of line or space selected.
       Click L and M button on staff - Enter flat pitch of line or space.
       Click R and M button on staff - Enter sharp pitch of line or space.
       Click M button on staff       - Enter natural pitch of line or space.
       Click L and M buttons         - Enter a colon (" : ") for chords.
       Click any button on menu bar  - Activate normal function key.
       Click all three buttons       - Abandon Input and Exit (same as ESC).

MIDI Keyboard:
       Play notes and chords - Enter note and chord pitches.

.